Trusted Site List Editor Help

The Trusted Site List contains those Web Sites with which you are automatically authenticated. All entries are listed by the date that they were last accessed (the most recently accessed are listed first).

To stop automatic authentication at a web site:

Using your mouse, highlight the Web Site from the list and click on the Delete button. Click on the Close button to close the Trusted Site List Editor.

To change the default organization you use to authenticate at a site:

Using your mouse, highlight the Web Site from the list and click on the Delete button. Click on the Close button to close the Trusted Site List Editor.

Using your Remote Passphrase Authentication (RPA) enabled Web browser, revisit the site and authenticate your identity using a different authenticating organization, username and passphrase.  Make sure you check the Automatically Authenticate checkbox if you want to keep this change in your Trusted Site List.

To change the default identity used for authentication at a particular Web site:

Using your mouse, highlight the Web Site from the list and click on the Delete button. Click on the Close button to close the Trusted Site List Editor.

Using your RPA-enabled Web browser, revisit the site and authenticate using a different username and passphrase. Make sure you check the Automatically Authenticate checkbox if you want to keep this change in your Trusted Site List.